(GeV) s 210^310^410

〉η/d_{ch}Nd〈

0 1 2 3 4 5 6 7 8 9 0.103(2) s∝ INEL, fit ^{0.111(4)}s∝

INEL>0, fit ALICE ALICE CMS PHOBOS )p UA5 (p ISR

| < 0.5 η|